-- sys_menu菜单表结构修改、去掉主键自增
ALTER TABLE `sys_menu`
	CHANGE COLUMN `menu_id` `menu_id` BIGINT(19) NOT NULL COMMENT '菜单ID' FIRST,
	CHANGE COLUMN `order_num` `order_num` INT(4) NULL DEFAULT '0' COMMENT '显示顺序' AFTER `parent_id`,
	CHANGE COLUMN `query` `query_param` VARCHAR(255) NULL DEFAULT NULL COMMENT '路由参数' COLLATE 'utf8mb4_bin' AFTER `component`,
	CHANGE COLUMN `is_frame` `is_frame` INT(1) NULL DEFAULT '1' COMMENT '是否为外链（0是 1否）' AFTER `query_param`,
	CHANGE COLUMN `is_cache` `is_cache` INT(1) NULL DEFAULT '0' COMMENT '是否缓存（0缓存 1不缓存）' AFTER `is_frame`;
-- gen_table表去掉主键自增
ALTER TABLE `gen_table`
    CHANGE COLUMN `table_id` `table_id` BIGINT(19) NOT NULL COMMENT '编号' FIRST;
-- gen_table_column表去掉主键自增
ALTER TABLE `gen_table_column`
    CHANGE COLUMN `column_id` `column_id` BIGINT(19) NOT NULL COMMENT '编号' FIRST;

ALTER TABLE `sys_tenant` DROP COLUMN `create_dept`;

-- 修改数据库表的del_flag字段为smallint类型
ALTER TABLE `sys_client`
    CHANGE COLUMN `del_flag` `del_flag` SMALLINT NULL DEFAULT '0' COMMENT '删除标志（0代表存在 1代表删除）' COLLATE 'utf8mb4_bin' AFTER `status`;
ALTER TABLE `sys_dept`
    CHANGE COLUMN `del_flag` `del_flag` SMALLINT NULL DEFAULT '0' COMMENT '删除标志（0代表存在 1代表删除）' COLLATE 'utf8mb4_bin' AFTER `status`;
ALTER TABLE `sys_role`
    CHANGE COLUMN `del_flag` `del_flag` SMALLINT NULL DEFAULT '0' COMMENT '删除标志（0代表存在 1代表删除）' COLLATE 'utf8mb4_bin' AFTER `status`;
ALTER TABLE `sys_tenant`
    CHANGE COLUMN `del_flag` `del_flag` SMALLINT NULL DEFAULT '0' COMMENT '删除标志（0代表存在 1代表删除）' COLLATE 'utf8mb4_bin' AFTER `status`;
ALTER TABLE `sys_user`
    CHANGE COLUMN `del_flag` `del_flag` SMALLINT NULL DEFAULT '0' COMMENT '删除标志（0代表存在 1代表删除）' COLLATE 'utf8mb4_bin' AFTER `status`;


